                                                        Datum: 26-8-97

            C7=10u
            C8=100n

                                                                                                                   =+5V

                                                                                                               VDD

                                                                                                                 GND

                                                                                                    PIN_25

                                                                                                             VDD

                                                                                                        VDD

                D2

                                                                IC4

   IC2

27C512

   28

VDD

  22

OE

14 GND

19 D7

18 D6

17 D5

16 D4

15 D3

13 D2

12 D1

11 D0

  20

CE

24 A9
25 A8

3 A7
4 A6

5 A5
6 A4

7 A3
8 A2

1 A15
27 A14
26 A13

2 A12

23 A11

21 A10

9 A1
10 A0

VDD

PIN_17

                                                                   IC1,IC4=XC3042PC84-70

           IC6E,F
           IC6C,D

                                                                     HRPT/PDUS decoder/generator

                         R8=10k

J3

weggelaten worden!

PIN_14

R_CLK PIN_1

                     VDD

           VDD

                   SI

OEN

K5
KI

K4

K3

K2

PIN_8

PDO2

PDO1 PIN_9

PDO10 PIN_13

PDO9 PIN_12

PDO8 PIN_2

STRTDAT PIN_11

FRMOK PIN_15

van PC

NAAR PAR. POORT

VDD

            R7=4k7

                       VDD

            R4=100 ohm

               74HCT14

                                       C2=4p-20p

                             VDD

            IC3A-D

                 14

                 VDD

                  7

                                       C4=100n

                                                          VDD

L1=12 uH

          S1-5

                                                                C2

                                                 R3

                                                  C3

                                                          D1

                                                 R4

                                                   R5

                                                         C4
                                                        R6

                                                                                            VDD

VDD

                                                                                          VDD

R3=4k7

C5

R2=220 ohm

R1=1M
            R6=100k

                                                       VDD

                                                                                    RL

                                                                                           VDD

RL

C6

ALARM

                                                                                                            2400x1070
                                                                                                             1800x940

                                                           L1

PIN_4

PDO6 PIN_5

PDO5 PIN_6

PDO4 PIN_7

PDO3

PIN_3

PDO7

KM

PIN_10

READYN

PIN_16

K1

    KIK5

    K4

    K3K2

    K1

                                                 D2=1N4148

                                                 D1=BB109

                                       C3=330p

                        SX

               SD

          (6x)

WEN

J1

HRPT_IN

J2

HRPT_OUT

   R8

    KM

         SM

                                       C1=27p
            R5=100k

                                                                                             R. Alblas

           RS

                 RS
                (3x)

                      HSEL

R9

                         R10=220 ohm

R10

                                       C5=10p
                                       C6=10p

                         RL=820 ohm
                         RS=10k
S1-S5, SI en SM mogen evt.

                         R9=1M IC2=27C512
                                                                   IC3,IC6=74HCT14
                                                                   IC5=514256

IC6A,B

                                                 XT=4.433619 MHz

XT

                                                                         R7

                                                         C1

                                                                IC3E,F

                                       IC1

                           XC3042PC84-70

  GND

43

   64

VCC

                        2

                       80

                        7

52

13

4849

                        63

1415
1617
18
1920

23
2425
26

                        69

2728
29
30

                        59

                       79

4746

44

40

3938

35

51

50

37

45

57

53

                        54

                        71

12

33

3132

36

42

34

73

5556

58

60

62

70

72

61

74

                       11

                       84
                       82

                       78
                       77

                       81

                       83

                        8

                       10

                       7675

41

                        65

21 66

                        68
                        67

6
43

5

9

  VCC

22

GND 1

                      R1
                                R2

C8

                                                                                                                     C7

                                                   GR

                                                     (3x)

                                                     SYNC

                                              ERR
  RL
(6x)

                                                                      IC5

                                                           XC3042PC84-70

  GND

43

   64

VCC

                        2

                       80

                        7

52

13

48
49

                        63

1415
16
1718
19
20

2324
2526

                        69

27
2829
30

                        59

                       79

4746

44

4039

38

35

5150

37

45

57

53

                        54

                        71

12

33

3132

36

42

34

73

55

56

58

60

62

70

72

61

74

                       11

                       84
                       82

                       7877

                       81

                       83

                        8

                       10

                       7675

41

                        65

21 66

                        6867

6
4
3

5

9

  VCC

22

                                            GND 1

           8

         A2

20 GND

16 OE

10 VDD 9

       A3 11

         A4

          12

       A5 7

       A1 13

       A6 6

       A0 14

       A7 15

         A8

           4

       RAS 3

       WE 17

         CAS

           2

       D1 18

         D2

         19

       D3 1

         D0

5

514256